Average oblique mercator projection (origin- 97 E, 47 S & azimuth- N25E) illuminated from 090

40˚

50˚

50˚

60˚

60˚

70˚

70˚

80˚

80˚ 90˚

90˚

100˚

100˚

110˚

110˚

120˚

120˚

130˚

130˚

140˚

140˚

150˚

150˚

160˚

160˚

170˚

180˚

180˚

190˚

200˚

-80˚

-80˚

-70˚

-70˚

-60˚

-60˚

-50˚

-50˚

-40˚

-40˚

-30˚

-30˚

-20˚

-20˚

-10˚

-10˚